From fca59bea770346cf1c1f9b0e00cb48a61b44a8f3 Mon Sep 17 00:00:00 2001
From: Harald Welte <laforge@gnumonks.org>
Date: Sun, 25 Oct 2015 21:00:20 +0100
Subject: import of old now defunct presentation slides svn repo

---
 .../OLS2005/reix/reix-abstract.tex                 | 35 ++++++++++++++++++++++
 1 file changed, 35 insertions(+)
 create mode 100644 2005/flow-accounting-ols2005/OLS2005/reix/reix-abstract.tex

(limited to '2005/flow-accounting-ols2005/OLS2005/reix/reix-abstract.tex')

diff --git a/2005/flow-accounting-ols2005/OLS2005/reix/reix-abstract.tex b/2005/flow-accounting-ols2005/OLS2005/reix/reix-abstract.tex
new file mode 100644
index 0000000..187d0e2
--- /dev/null
+++ b/2005/flow-accounting-ols2005/OLS2005/reix/reix-abstract.tex
@@ -0,0 +1,35 @@
+
+%         Registration                   NPTL Stabilization Project           
+%  [2]Register/Submit Proposal Tony Franc,ois Claude Reix                     
+%                              (tony.reix@bull.net)                           
+
+Our project is a stabilization effort on the   
+GNU libc thread library NPTL---Native POSIX    
+Threading Library. To achieve this, we focused 
+our work on extending the pool of open-source  
+tests and on providing a tool for tracing the  
+internal mechanisms of the library.            
+
+This paper introduces our work with a short    
+status on tests coverage of the NPTL at the    
+beginning of the project (February 2004). It   
+explains how we built the prioritized list of  
+NPTL routines to be tested. It then describes  
+our methodology for designing tests in the     
+following areas: conformance to POSIX          
+standard, scalability and stress. It also      
+explains how we have simplified the use of the 
+tests and the analysis of the results.         
+Finally, it provides figures about our results 
+and it shows how the NPTL has evolved during   
+year 2004.                                     
+
+The paper goes on to explain how the NPTL      
+Trace Tool can help NPTL users and hackers to  
+understand and fix problems. It describes the  
+features of the tool and presents our chosen   
+architecture. Finally, it shows the current    
+status of the project and the possible future  
+extensions.                                    
+
+
-- 
cgit v1.2.3

