From 4e42d2f9c1ba99fc8814bb2b25c8921bf20522f0 Mon Sep 17 00:00:00 2001
From: Harald Welte <laforge@gnumonks.org>
Date: Wed, 28 Dec 2016 15:11:26 +0100
Subject: 33c3: mention root password, fix typo

---
 2016/33c3/33c3-modems.adoc | 8 +++++---
 1 file changed, 5 insertions(+), 3 deletions(-)

(limited to '2016/33c3/33c3-modems.adoc')

diff --git a/2016/33c3/33c3-modems.adoc b/2016/33c3/33c3-modems.adoc
index 1ecb443..fddfd29 100644
--- a/2016/33c3/33c3-modems.adoc
+++ b/2016/33c3/33c3-modems.adoc
@@ -136,9 +136,11 @@ image:images/mpcie_breakout.jpg[width="70%"]
   not easy to add external level shifter / Vref)
 * create Osmocom multi-voltage USB-UART with selectable 1.8,
   2.3, 2.5, 2.8, 3.0 and 3.3V logic level
-* https://osmocom.org/projects/mv-uart/wiki
 
-image:images/mv_uart.jpg[width="40%"]
+image:images/mv_uart.jpg[width="40%",role="gimmick_right"]
+
+* https://osmocom.org/projects/mv-uart/wiki
+* root password (DES hash): `oelinux123`
 
 == Retro-fitting Serial Console to mPCIe module
 
@@ -405,7 +407,7 @@ cd /cache/ufs;ls
 
 == recovery and applypatch
 
-* Qualcom uses https://android.googlesource.com/platform/bootable/recovery.git/+/android-4.0.4_r2.1[recovery.git] from Android ~4.0
+* Qualcomm uses https://android.googlesource.com/platform/bootable/recovery.git/+/android-4.0.4_r2.1[recovery.git] from Android ~4.0
 * Updates are zip files with deltas, SHA1+RSA
 * recovery started on boot, drives applypatch
 ----
-- 
cgit v1.2.3

